0 10 20 30 40 50 1.5 2 2.5 3 3.5

0.05 0.1 0.15 0.2 0.25 0.3 CDF PRELIMINARY

Inclusive Muon Data

Σ_3 E_T (GeV)

ΔΦ_{12} (rad)

Z 5 e^+ e^- Data

Σ_3 E_T (GeV)

ΔΦ_{12} (rad)

0 10 20 30 40 50 1.5 2 2.5 3 3.5

0.05 0.1 0.15 0.2 0.25 0.3