CDF PRELIMINARY

ΔΦ_{12} (radians)

Events per 0.05 radians

Excess over background predictions — Expected shape for Z decays

0

5

10

15

20

25

30

35

40

45

50

3 3.02 3.04 3.06 3.08 3.1 3.12 3.14