CDF PRELIMINARY

Σ_3E_T cut defining the Signal Zone (GeV)

Expected signal significance (σ)

— 2Ψ Systematics — 3Ψ Systematics — 4Ψ Systematics — 5Ψ Systematics

Σ_3E_TΛ 10 GeV

0

0.5

1

1.5

2

2.5

3

3.5

5 10 15 20 25 30 35 40 45