CDF PRELIMINARY

ΔΦ_{12} cut defining the Signal Zone (radians)

Expected signal significance (σ)

— 2Ψ Systematics — 3Ψ Systematics — 4Ψ Systematics — 5Ψ Systematics

ΔΦ_{12}Γ 3 radians

0

0.5

1

1.5

2

2.5

3

3.5

2.6 2.7 2.8 2.9 3 3.1