CDF PRELIMINARY

Half Bin Size around M_Z (GeV/c^2)

Expected Signal Significance (σ)

— 2Ψ Systematics — 3Ψ Systematics — 4Ψ Systematics — 5Ψ Systematics

Bin Size 40 GeV/c^2 (70 Λ M_{jj} Λ 110 GeV/c^2)

0

0.5

1

1.5

2

2.5

3

3.5

5 10 15 20 25 30 35 40 45